Condensed Matter Physics 2007, Vol. 10, No 4(52), pp. 471–480

Hydration free energy of hard-sphere solute over a wide range of size studied by various types of solution theories

N.Matubayasi^{1,2∗}, M.Kinoshita^3, M.Nakahara^1

1 Institute for Chemical Research, Kyoto University, Uji, Kyoto 611–0011, Japan

2 Japan Science and Technology Agency (JST), CREST, Kawaguchi, Saitama 332-0012, Japan

3 Institute for Advanced Energy, Kyoto University, Uji, Kyoto 611–0011, Japan

Received August 16, 2007, in final form October 6, 2007

The hydration free energy of hard-sphere solute is evaluated over a wide range of size using the method of energy representation, information-theoretic approach, reference interaction site model, and scaled-particle theory. The former three are distribution function theories and the hydration free energy is formulated to reflect the solution structure through distribution functions. The presence of the volume-dependent term is pointed out for the distribution function theories, and the asymptotic behavior in the limit of large solute size is identified. It is indicated that the volume-dependent term is a key to the improvement of distribution function theories toward the application to large molecules.

Key words: hydration free energy, water, hard sphere, size dependence, energy representation, occupancy distribution

PACS: 05.20.Jj, 61.20.Gy, 61.20.Ne, 61.20.Qg, 61.25.Em, 82.60.Lf

1. Introduction

Hydrophobicity plays a central role in the formation of self-organizing structures such as protein, micelle, and membrane in aqueous solution. The key idea of hydrophobicity is that water tends to reduce its contact with nonpolar solutes and promotes their association. Among various components of solute-solvent (water) interactions, the repulsive part is the origin of hydrophobicity. It is then insightful to focus on the effect of the repulsive interaction in hydration thermodynamics since one of the purposes of solution theory is to clarify how molecular interactions manifest themselves in the observable.

To isolate the effect of the repulsive interaction, the hard core particle is an ideal target of investigation. Its interaction with the solvent is purely repulsive and infinitely hard at the contact distance. The solvation (hydration) of a hard particle is a process to exclude the solvent (water) molecules from the region which the hard particle occupies. In fact, the concept of exclusion is not restricted to a molecular object. On the macroscopic or hydrodynamic scale, the solvent exclusion is a common process which leads, for example, to buoyancy. Given that the exclusion effect is operative for both macroscopic and molecular objects, it is of interest to examine the dependence on size. When a macroscopic object is of concern, its geometrical properties such as volume and surface area describe the effect of solvent exclusion; since a macroscopic system has a sharp boundary in its length scale, the volume and surface area can be defined without ambiguity. As for a molecule, in contrast, some ambiguity is always present in the definitions of volume and surface area since the “boundary” of a molecule is vague. From the viewpoint of solvent exclusion over a wide range of size, the hard particle is a useful target of examination. Even on the molecular

∗Corresponding author. E-mail: nobuyuki@scl.kyoto-u.ac.jp

© N.Matubayasi, M.Kinoshita, M.Nakahara 471

level, its boundary is sharp and the geometrical properties such as volume and surface area can be defined without ambiguity.

In the present work, we focus on the hydration of hard-sphere particle. We evaluate the free energy of hydration over a wide range of size, and discuss the volume dependence to connect macroscopic and microscopic behaviors. The hydration free energy is calculated using 4 approaches: (1) method of energy representation, [1–4] (2) information-theoretic approach, [5–7] (3) reference interaction site model (RISM), [8–12] and (4) scaled-particle theory [13,14]. (1), (2), and (3) are molecular approaches in the sense that the structural information of the solution needs to be incorporated, while (4) is not a molecular scheme in that sense. Although (1) and (3) are applicable to general types of solute-solvent interactions, their usage is restricted to hard-sphere solute in the present work. In their formulations, on the other hand, (2) and (4) are specialized to the treatment of hard particle. As shown in section 2, (1) and (2) adopt the structural information of pure water from molecular simulation, and (3) and (4) are processed relying only upon potential functions or geometrical parameters.

2. Theory and methodology

In this section, we briefly review the approaches employed in the present work. The system treated is the aqueous solution of hard-sphere solute at infinite dilution. A single solute molecule is dissolved in water.

The method of energy representation is a theory of distribution functions in solution with emphasis on the free energy of solvation (hydration) [1–3]. In the energy representation, the solutesolvent interaction energy is adopted as the coordinate of the distribution functions, and a functional for the solvation free energy is constructed in terms of energy distribution functions in the solution and reference solvent (pure water) systems of interest. Let ρ be the bulk density of the pure solvent and v be the volume from which the solvent is excluded. When the solute is a hard particle, the currently used version of functional [2] for the solvation free energy Δμ reduces to a simple form as derived in Appendix A and is given by

Ω = 1 − ⟨n⟩ ⟨n^2⟩ − ⟨n⟩^2

, (1)

Δμ = ρvk_BT log (1 − Ω) ( 1 − 1 Ω ) , (2)

where k_B is the Boltzmann constant, T is the temperature, and n is the occupancy number of solvent molecules in the region which the hard solute is to occupy after insertion. Ω is defined by equation (1) from the first and second cumulants of n, where the average ⟨· · ·⟩ is taken in the pure solvent. When the system is the solution and the hard solute is present at full coupling of the solute-solvent interaction, n is always zero. When the system is the pure solvent and the region of insertion is specified by treating the solute as a test particle, n is variable. ⟨n⟩ is the average number of solvent molecules in the region of insertion and is equal to ρv. The term (⟨ n^2 ⟩ − ⟨n⟩^2 ) reflects the solvent-solvent correlation in the pure solvent. This correlation affects the solvation free energy Δμ through Ω. As noted in the footnote 44 of [2], no input is necessary from the solution system when the solute is a hard particle. Molecular simulation of the pure solvent system is necessary only to obtain (⟨ n^2 ⟩ − ⟨n⟩^2 ) . The factor written as ⟨ n^2 ⟩ − ⟨n⟩^2 ⟨n⟩ (3) corresponds to the number fluctuation of the solvent molecules contained in the region of exclusion. In the limit of large size of the region, this factor approaches ρk_BT χ_T, where χ_T is the isothermal compressibility of the pure solvent system. At liquid conditions, the factor is much smaller than unity. Actually, the functional described in [2] is a combined functional of the Percus-Yevick (PY)- and hypernetted-chain (HNC)-type approximations. Since Ω < 0 holds in the conditions studied in the present work, the PY-type form is adopted and the functional is simplified into equation (2) [15].

The second approach examined in the present work is the information-theoretic approach [5–7]. In this approach, a Gaussian-like approximation is adopted for the probability of the occupancy number n of solvent molecules contained within the region of solute insertion in the pure solvent system. In Hummer et al.’s version, [5] the probability p_n is set to

p_n = exp ( λ_0 + λ_1n + λ_2n^2 ) , (4)

where λ_0, λ_1, and λ_2 are determined from a set of constraints expressed as ∑ n p_n = 1 ∑ n np_n = ⟨n⟩ ∑ n n^2p_n = ⟨ n^2 ⟩ . (5)

In equation (5), ⟨· · ·⟩ is the average in the pure solvent system, as is so for equation (1). ⟨ n^2 ⟩ is an input brought from molecular simulation of the pure solvent and carries the information of solvent-solvent correlation. The solvation free energy Δμ of a hard particle is then given by

Δμ = −k_BT log p_0 = −k_BT λ_0 . (6)

The third approach employed in the present work is the reference interaction site model (RISM) [8–12]. In this approach, the site-site form of Ornstein-Zernike equation is formulated to introduce the direct correlation function and a closure relationship is adopted to give a self-consistent integral equation for pair correlation functions. The site-site radial distribution functions are obtained from the integral equation and determine the solvation free energy.

The fourth approach is the scaled-particle theory. It provides an analytically convenient expression for the solvation free energy of hard-sphere solute [13,14]. In this theory, the detailed interaction and structure of the solution are not taken into account explicitly and affect the solvation free energy of the hard-sphere solute only through the solvent density ρ, pressure P , and temperature T of the system. The solvent molecule is modeled as a hard sphere with a properly chosen diameter σ_v. When the radius of solvent exclusion (cavity) is λ, the corresponding solute has a diameter of 2λ − σ_v. Since we are concerned with cavities of realistic size, we restrict our attention to the solutes which involve positive diameters and satisfy λ ⩾ σ_v/2. The free energy Δμ of solvation (cavity formation) is then expressed in the scaled-particle theory as [13,14]

Δμ = −k_BT [ log (1 − y) − ( 3y 1 − y ) R − { 3y 1 − y + 9 2 ( 3y 1 − y

)_2} R^2 ] + yP ρ R^3, (7)

where y is the packing fraction of the solvent defined as y = π 6 ρσ^3_v (8)

and R is the ratio of the solute diameter to the solvent diameter given by R = 2λ − σ_v σ_v

. (9)

When the solvent is water, σ_v is actually an effective diameter of the solvent molecule. It is an adjustable parameter in equation (7), and a value of 2.8 Å is adopted in the present work. This value is the best-fit value obtained in a previous molecular simulation [16]. Actually, an exact expression for Δμ is available when the cavity radius λ is small enough or large enough; when λ is very large, Δμ is simply the product of the pressure P and the cavity volume. Equation (7) was formulated to smoothly interpolate the limits of small λ and large λ [13,14].

In this paper, we express the size of the hard sphere by the radius λ of solvent exclusion. As noted above, it corresponds to the hard sphere diameter 2λ − σ_v when the solvent diameter is set to σ_v. We employ water as the solvent at 25^∘C and 1.0 g/cm^3, and identify the region of solvent exclusion in terms of the hard-sphere center and the position of the oxygen atom. In this case, the factor of equation (3) appearing in equations (1) and (5) is given by ⟨ n^2 ⟩ − ⟨n⟩^2 ⟨n⟩ = 1 + 4πρ

∫_{2λ} 0 drr^2 (g(r) − 1) ( 1 − r 2λ )_2 ( 1 + r 4λ ) , (10)

where g(r) is the oxygen-oxygen radial distribution function of pure water. In the present work, g(r) used to calculate Δμ with the method of energy representation and the information-theoretic approach was obtained from a molecular dynamics simulation of pure water. The potential model employed was the SPC/E model [17], and the simulation was performed for 100 ps in the canonical ensemble at 25^∘C and 1.0 g/cm^3. The number of water molecules in the unit cell was 10000, and the edge length of the cubic cell was ∼67 Å. When we calculated equation (10) with g(r) as an input, we used the g(r) from the SPC/E simulation in the range of r < 30 Å.

In the RISM calculation, we actually employed the dielectrically consistent version referred to as the DRISM theory [12]. The HNC approximation was adopted as the closure. The SPC/E model was used as the water model, and the temperature and density were the same as the above. A necessary modification in the DRISM calculation was that a repulsive core is incorporated at the H site. This is needed to avoid catastrophic overlap of the interaction sites [18,19]. Accordingly, the H site was also treated as a hard sphere of diameter 0.4 Å when a hard-sphere solute is inserted into water. Further, a hard-sphere diameter of 2.8 Å was assigned to the O site. Thus, when the radius of solvent exclusion measured with respect to the hard-sphere center and the O site is λ, additional hard interaction of radius (λ − 1.2) Å is incorporated between the hard-sphere center and the H site in the DRISM calculation [20]. The details of the DRISM methodology are described in [21,22]. A supplementary discussion using the molecular Ornstein-Zernike approach is presented in Appendix B.

3. Results and discussion

In figure 1, we show the hydration free energy Δμ as a function of the cavity radius λ. In the range of λ^<∼ 3 Å, the Δμ values from the method of energy representation and the informationtheoretic approach are indistinguishable from those by the scaled-particle theory. In this range, since the scaled-particle theory provides essentially exact values, [16] the above two methods are shown to be superior in treating a hard particle of relatively small size. At λ^>∼ 10 Å, the information-theoretic approach was found not to give a converged result since the argument in the exponential function of equation (4) was too large and the calculation in double precision was terminated.

When the size of a molecule is large, Δμ is commonly expressed to be proportional to the surface area [23–25]. In figure 2, we show Δμ/(4πλ^2) as a function of λ. It is seen that Δμ calculated by the scaled-particle theory grows with the surface area 4πλ^2 when λ^>∼ 10 Å. In the other approaches, Δμ/(4πλ^2) increases with λ over the whole range of λ examined in the present work. Actually, the increase is linear, and this shows the presence of a volume-dependent term in the molecular length scale.

In real systems, the dispersion attraction is operative between a hydrophobic solute and water. Since the dispersion interaction is short-ranged, its contribution to Δμ is expected to be proportional to the surface area and to λ^2 when λ is large. In previous treatments, although the effect of dispersion attraction is incorporated as perturbation, [13,14,24–26] it is not negligible in Δμ. This shows that the λ^2 term is reduced from that given in figures 1 and 2 when the dispersion attraction is introduced in the calculation.

Figure 1. The hydration free energy Δμ as a function of the cavity radius λ calculated using the method of energy representation (denoted as ER in the figure), the information-theoretic approach (denoted as IT), the RISM-HNC approach (denoted as RISM), and the scaled-particle theory (denoted as SPT).

Figure 2. Δμ/(4πλ^2), the hydration free energy scaled by the surface area of the cavity as a function of the cavity radius λ calculated using the method of energy representation (denoted as ER in the figure), the information-theoretic approach (denoted as IT), the RISM-HNC approach (denoted as RISM), and the scaled-particle theory (denoted as SPT).

In the limit of large λ, the exact Δμ approaches P v, where P is the pressure, and v is the volume of the exclusion region and is equal to (4/3)πλ^3. By construction, the scaled-particle theory gives the correct limit value. In the other approaches examined, in contrast, the large-λ behavior of Δμ is not exact and is discussed in the following.

To determine the asymptotic value of Δμ at large v in the method of energy representation and the information-theoretic approach, it is useful to note that when the region of solvent exclusion is large enough, the factor of equation (3) reduces to ⟨ n^2 ⟩ − ⟨n⟩^2 ⟨n⟩ = ρk_BT χ_T , (11)

where χ_T is the isothermal compressibility of the pure solvent system. The expression in the energy representation given by equation (2) then leads, by virtue of ρk_BT χ_T ≪ 1 at liquid conditions, to

Δμ ≈ ρvk_BT log ( 1 ρk_BT χ_T ) . (12)

In the information-theoretic approach, it was shown that the asymptotic form is expressed as [6]

Δμ ≈ v 2χ_T

. (13)

It should be noted that equations (12) and (13) are valid for a hard particle of any shape; the validity is not restricted to a hard-sphere solute.

In water at 25^∘C and 1.0 g/cm^3,

ρk_BT log ( 1 ρk_BT χ_T ) ≈ 3700 atm , 1 2χ_T

≈ 10000 atm (14)

with the χ_T value of 4.8 · 10^{−5} atm^{−1} for the SPC/E model (this value corresponds well to the experimental value of 4.6 · 10^{−5} atm^{−1}) [16]. With the RISM approach, the inspection of figure 2 indicates that Δμ/v is ∼10000 atm at large v, and indeed agrees with the analytical expression at large v. The analytical expression in the RISM-HNC approach is presented in Appendix B.

The Δμ/v calculated above are the asymptotic values of Δμ/v at large enough v. The comparison of the values shows that the method of energy representation provides a better estimate of Δμ for a large solute. The exact value of Δμ/v is 1 atm, [27] however, and it is concluded that except for the scaled-particle theory, the theories of solutions examined in the present work overestimate the v dependent term. Actually, since the surface tension of water is ∼70 mN/m, the volume term is dominant only when λ^>∼ 1 μm in the exact treatment. The scaled-particle theory incorporates the correct limiting behavior of the P v term in its construction. According to the asymptotic analysis, in contrast, the other approaches may exhibit an evident volume dependence even in the nanometer-scale. This is caused by the fact that the large v behavior is determined by the isothermal compressibility χ_T, rather than the pressure P . The solvation free energy needs to be nicely computed in the nanometer-scale when its quantitative analysis is necessary for self-organizing structures such as protein, micelle, and membrane. A key to improve the large v behavior of the solvation free energy in distribution function theories will be to accurately and smoothly incorporate the crossover of the volume-dependent term from the χ_T-dominated form to the P -dominated one.

Acknowledgements

This work is supported by the Grant-in-Aid for Scientific Research (No. 18350004) from the Japan Society for the Promotion of Science and the Grants-in-Aid for Scientific Research on Priority Areas (Nos. 15076203 and 15076205) and the Nanoscience Program of the Next-Generation Supercomputing Project from the Ministry of Education, Culture, Sports, Science, and Technology. N. M. is also grateful to the grant from the Association for the Progress of New Chemistry, the grant from the Suntory Institute for Bioorganic Research, and the Supercomputer Laboratory of Institute for Chemical Research, Kyoto University. Finally but not less importantly, we congratulate the 60th anniversary of Prof. Fumio Hirata. N. M. started his studies of solutions under Fumio’s influence and owes a lot to him throughout the carrier. M. K. and M. N. are Fumio’s long-time friends and always keep positive relationship for the common purpose of understanding the solutions.

Appendix A

In this Appendix, we derive equation (2) from the functional given in [2]. Within the present Appendix, the notations are adopted from [2]. In [2], the functional for the solvation free energy is given by equations (5), (12), and (18)–(21).

In the energy representation, the instantaneous distribution ^ρ^e(ϵ) is defined by equation (1) of [2]. As noted in Appendix E of [1], the hard-core potential is characterized by a single parameter ξ which is much larger than the thermal energy (k_BT ) and is practically considered to be infinite. When the solvent molecule overlaps with the solute, the solute-solvent interaction energy is ξ, and when the solvent is outside the region of exclusion, the pair energy is simply 0. In this case, ^ρ^e(ϵ) reduces to ^ρ^e(ϵ) = nδ (ϵ − ξ) + (N − n)δ (ϵ), (15)

where N is the total number of solvent molecules in the system and n is the occupancy number of solvent molecules in the region which the hard solute is to occupy upon insertion. Equation 5 of [2] is then simplified correspondingly, and the first three read as

ρ^e(ϵ) = Nδ (ϵ), ρ^e_0(ϵ) = ⟨n⟩ δ (ϵ − ξ) + (N − ⟨n⟩)δ (ϵ),

χ^e_0(ϵ, η) = (⟨ n^2 ⟩ − ⟨n⟩^2 ) [δ (ϵ − ξ) δ (η − ξ) − δ (ϵ) δ (η − ξ) − δ (ϵ − ξ) δ (η) + δ (ϵ) δ (η)]. (16)

When the solute is present at full coupling of the solute-solvent interaction, n = 0 holds since the solvent molecule cannot overlap with the solute. Thus, the first of equation (16) is particularly simple. In the second and third, ⟨· · ·⟩ is the average in the pure solvent system in which the solute is treated only as a test particle. Actually, the third of equation (16) is derived by noting that N is invariant against the change in the system configuration.

According to equation (12) of [2] and equation (16) above, only the coordinate points of ϵ = ξ and 0 contribute to the integral. It is not necessary to take into consideration the other values of ϵ. Equation 21 of [2] shows that the weight factor α is zero at ϵ = ξ and is unity at ϵ = 0. It is then necessary to set the value of w^e only at ϵ = 0 and the value of w^e_0 at ϵ = ξ. The w^e value at ϵ = ξ is not needed since ρ^e is zero at ϵ = ξ. At ϵ = 0, w^e is simply equal to

−k_BT log ( N N − ⟨n⟩ ) . (17)

When N is large enough, equation (17) above is of the order 1/N, and F of equation (19) of [2] vanishes. The contribution to Δμ from ϵ = 0 is then given by

−k_BT [ ⟨n⟩ − N log ( N N − ⟨n⟩ )] = O ( 1 N^2 ) (18)

and can be neglected at large enough N. Thus, the coordinate point of ϵ = 0 makes no contribution to Δμ.

At ϵ = ξ, it is necessary to identify w^e_0 from the fifth of equation (5) of [2]. From equation (16) above, equation (B5) of [3] is solved to determine ū^e_0 therein; ū^e_0 is equal to

k_BT ⟨n⟩ ⟨n^2⟩ − ⟨n⟩^2

(19)

at ϵ = ξ and is zero at ϵ = 0. w^e_0 is then equal to k_BT Ω at ϵ = ξ, where Ω is given by equation (1) in section 2. The contribution to Δμ from ϵ = ξ is thus written as

k_BT ⟨n⟩ log (1 − Ω) ( 1 − 1 Ω ) when Ω ⩽ 0,

k_BT ⟨n⟩ ( 1 − Ω 2 ) when Ω ⩾ 0.

(20)

In liquid conditions, Ω < 0 holds, and equation (2) is derived [15].

Appendix B

We supplement the integral equation treatment with the molecular Ornstein-Zernike (MOZ) theory, in which the pair correlation functions and the integral equation are explicitly dependent on angular coordinates as well as on the radial distance. The multipole model was adopted for the water molecule; it is a hard sphere of diameter 2.8 Å in which a point dipole and a point quadrupole of tetrahedral symmetry are embedded [28]. The dipole moment was determined through the iterative procedure given in [28] to incorporate the polarization effect in the mean-field sense. The resulting value at 25^∘C and 1.0 g/cm^3 was found to be enhanced by 40% from the value at isolation (in dilute gas); it is equal to 2.6 D and is in agreement with the commonly accepted value in liquid [29]. The quadrupole moment was taken to be 2.6 · 10^{−26} esu cm^2, the gas-phase value. The HNC approximation was adopted as the closure relationship. In order to numerically solve the MOZ- HNC equation, the pair potential and the correlation function were expanded in terms of rotational invariants. The methodological details are presented in [30,31].

The results of the MOZ-HNC scheme combined with the multipole water model were found to be within ∼20% from those of the method of energy representation in the small radius range of λ^<∼ 5 Å. When λ is larger, Δμ/(4πλ^2) was observed to involve an evident slope as a function of λ; the slope corresponds to the coefficient of the volume-dependent term. The asymptotic behavior of Δμ for large λ can be obtained from the closed-form expression for Δμ. In the MOZ-HNC approach, Δμ is expressed as [32]

Δμ = ρk_BT ∫ dx 8π^2 [ 1 2 h_{uv}(x)^2 − c_{uv}(x) − 1 2 h_{uv}(x)c_{uv}(x) ]

= ρk_BT ∫ dx 8π^2 [ 1 2 h_{uv}(x)^2 − 1 2 c_{uv}(x) − 1 2 g_{uv}(x)c_{uv}(x) ] , (21)

where x collectively denotes the position and orientation of the solvent (water) relative to the solute (hard sphere), and g_{uv}, h_{uv}, and c_{uv} are the pair correlation function, total correlation function, and direct correlation function, respectively, between solute and solvent. When the solute is at infinite dilution, the integrals of h_{uv} and c_{uv} over the whole configuration are given through the MOZ equation as ∫ dx 8π^2 h_{uv}(x) = ∫ dx 8π^2 c_{uv}(x) [ 1 + ρ ∫ dy 8π^2 h_{vv}(y) ] = ρk_BT χ_T ∫ dx 8π^2 c_{uv}(x), (22)

where h_{vv} is the total correlation function between solvent and solvent and its integral over the whole configuration gives the compressibility χ_T [33]. Equation (21) is then rewritten as

Δμ = ρk_BT 2 ∫ dx 8π^2 h_{uv}(x)^2 − 1 2χ_T ∫ dx 8π^2 h_{uv}(x) − ρk_BT 2 ∫ dx 8π^2 g_{uv}(x)c_{uv}(x). (23)

Within the region of solvent exclusion, g_{uv} = 0 and h_{uv} = −1. We further assume that h_{uv} and c_{uv} decay on the molecular length scale for any λ. Equation (23) then leads to

Δμ ≈ ρvk_BT 2 + v 2χ_T ≈ v 2χ_T

(24)

when the excluded volume v is large enough and ρk_BT χ_T ≪ 1. Note the correspondence of equation (24) with equation (13) [15]. In the multipole water model employed with the MOZ-HNC equation, χ_T was calculated to be 3.6 · 10^{−4} atm^{−1}, and is larger than the experimental value by an order of magnitude. In turn, the χ_T value leads to Δμ/v ≈ 1000 atm for a large enough cavity. This shows that with respect to the large v behavior, the MOZ-HNC approach combined with the multiple water model agrees apparently with the scaled-particle theory better than the other approaches treated in section 3.

The asymptotic analysis in the integral equation with the HNC closure is also possible for the RISM approach. In the RISM-HNC approximation, Δμ is expressed as [34]

Δμ = ρk_BT ∑ i,j ∫_∞ 0 dr4πr^2 [ 1 2 h_{ui,vj} (r)^2 − c_{ui,vj} (r) − 1 2 h_{ui,vj} (r)c_{ui,vj} (r) ]

= ρk_BT ∑ i,j ∫_∞ 0 dr4πr^2 [ 1 2 h_{ui,vj} (r)^2 − 1 2 c_{ui,vj} (r) − 1 2 g_{ui,vj} (r)c_{ui,vj} (r) ] , (25)

where r is the radial distance, and g_{ui,vj} , h_{ui,vj} , and c_{ui,vj} are the radial distribution function, total correlation function, and direct correlation function, respectively, between the i-th site of the solute and the j-th site of the solvent. The second term can be written as [35–37]

ρk_BT ∑ i,j ∫_∞ 0 dr4πr^2c_{ui,vj} (r) = − ΔV χ_T

, (26)

where ΔV is the excess partial molar volume of the solute. Δμ ≈ v/(2χ_T) then follows from the arguments similar to those deriving equation (24) from equation (21). In the RISM-HNC approach, χ_T was calculated to be 5.7·10^{−5} atm^{−1}. This leads to Δμ/v ≈ 10000 atm for a large enough cavity.

References

1. Matubayasi N., Nakahara M., J. Chem. Phys., 2000, 113, 6070. 2. Matubayasi N., Nakahara M., J. Chem. Phys., 2002, 117, 3605; 2003, 118, 2446. 3. Matubayasi N., Nakahara M., J. Chem. Phys., 2003, 119, 9686.

4. Takahashi H., Matubayasi N., Nakahara M., Nitta T., J. Chem. Phys., 2004, 121, 3989. 5. Hummer G., Garde S., García A.E., Pohorille A., Pratt L.R., Proc. Natl. Acad. Sci. U.S.A., 1996, 93, 8951.

6. Hummer G., Garde S., García A.E., Paulaitis M.E., Pratt L.R., J. Phys. Chem. B, 1998, 102, 10469. 7. Crooks G.E., Chandler D., Phys. Rev. E, 1997, 56, 4217. 8. Chandler D., Andersen H.C., J. Chem. Phys., 1972, 57, 1930. 9. Stell G., Patey G.N., Høye J.S., Adv. Chem. Phys., 1981, 48, 183. 10. Hirata F., Rossky P.J., Chem. Phys. Lett., 1981, 83, 329. 11. Rossky P.J., Pettitt B.M., Stell G., Mol. Phys., 1983, 50, 1263. 12. Perkyns J.S., Pettitt B.M., J. Chem. Phys., 1992, 97, 7656. 13. Pierotti R.A., J. Phys. Chem., 1965, 69, 281. 14. Pierotti R.A., Chem. Rev., 1976, 76, 717.

15. When Ω > 0, the HNC-type form is adopted. In this case, the solvation free energy Δμ is given by ρvkBT (1 − Ω/2). Accordingly, Δμ ≈ v/(2χT) holds when the excluded volume v is large enough, in correspondence to equations (13) and (24).

16. Matubayasi N., Nakahara M., J. Chem. Phys., 2000, 112, 8089. 17. Berendsen H.J.C., Grigera J.R., Straatsma T.P., J. Phys. Chem., 1987, 91, 6269. 18. Pettitt B.M., Rossky P.J., J. Chem. Phys., 1982, 77, 1451.

19. In the RISM approach, each interaction site needs to have a repulsive core. Actually, the repulsive core of the H site in water is not meaningful in the sense that its size does not affect any observable as far as the H core is buried within the core of the O site. The RISM exhibits unphysical dependence on the core parameter of the H site, and the core parameter used is actually the one tuned to treat liquid water.

20. When no interaction is present between the H site and the solute, the H site is called an “auxiliary” site which simply labels a point in a molecule and makes no contribution to intermolecular interaction. The RISM integral equation exhibits unphysical dependence on auxiliary sites, and our assignment of a hard-sphere diameter to the H site follows the convention adopted in [18]. In the other approaches treated in the present work, the results are not affected by the presence of auxiliary sites.

21. Kinoshita M., Hirata F., J. Chem. Phys., 1996, 104, 8807. 22. Kinoshita M., Okamoto Y., Hirata F., J. Comput. Chem., 1997, 18, 1320. 23. Ooi T., Oobatake M., Némethy G., Scheraga H.A., Proc. Natl. Acad. Sci. U.S.A., 19876, 84,3086. 24. Lum K., Chandler D., Weeks J.D., J. Phys. Chem. B, 1999, 103, 4570. 25. Chandler D., Nature, 2005, 437, 640.

26. Pratt L.R., Chandler D., J. Chem. Phys., 1977, 67, 3683.

27. When a model potential is employed for water, Δμ/v does not necessarily converge to 1 atm even in the exact treatment. Actually, the asymptotic value is the pressure calculated with the model potential. Even though such ambiguity is present in the pressure value to be employed as a reference for approximate approaches, the pressure discrepancies evaluated are still expected to be quite large.

28. Kusalik P.G., Patey G.N., J. Chem. Phys., 1988, 88, 7715. 29. Franks F., Water, A comprehensive treatise. Plenum, New York, 1972-1982. 30. Kinoshita M., Harada M., Mol. Phys., 1993, 79, 145.

31. Kinoshita M., Matubayasi N., Harano Y., Nakahara M., J. Chem. Phys., 2006, 124, 024512. 32. Morita T., Hiroike K., Prog. Theor. Phys., 1960, 23, 1003.

33. Hansen J.P., McDonald I.R., Theory of Simple Liquids. Academic Press, London, 1986. 34. Singer S.J., Chander D., Mol. Phys., 1985, 55, 621. 35. Kirkwood J.G., Buff F.P., J. Chem. Phys., 1951, 19, 774. 36. Imai T., Kinoshita M., Hirata F., J. Chem. Phys., 2000, 112, 9469. 37. Matubayasi N., Levy R.M., J. Phys. Chem., 1996, 100, 2681.

Вiльна енергiя гiдратацiї твердих сфер в широкiй областi розмiрiв дослiджувана рiзними теорiями розчинiв

Н.Матубаяшi^{1,2}, М.Кiношiта^3, М.Накахара^1

1 Iнститут хiмiчних дослiджень, унiверситет, м. Кiото, Японiя 2 Агенцiя японської науки i технологiї, м. Кавагучi, Японiя 3 Iнститут енергетики, унiверситет, м. Кiото, Японiя

Отримано 16 серпня 2007 р., в остаточному виглядi – 6 жовтня 2007 р.

Вiльна енергiя гiдратацiї твердих сфер в широкому iнтервалi розмiрiв розрахована методами енергетичного представлення, iнформацiйно-теоретичного пiдходу, методом базисних взаємодiючих силових центрiв та на основi теорiї масштабної частинки. Першi з трьох пов’язанi з методом функцiй розподiлу, а вiльна енергiя гiдратацiї вiдображає структуру розчину через функцiї розподiлу. Присутнiсть об’ємно-залежного доданка виходить за рамки теорiй на основi функцiй розподiлу. Асимптотична поведiнка в границi великої твердої сфери є iдентифiкована. Це вказує, що об’ємно-залежний доданок є ключовим для покращення теорiй, базованих на функцiях розподiлу, в застосуваннях до великих молекул.

Ключовi слова: вiльна енергiя гiдратацiї, вода, тверда сфера, залежнiсть вiд розмiру, представлення енергiї, розподiл зайнятостi

PACS: 05.20.Jj, 61.20.Gy, 61.20.Ne, 61.20.Qg, 61.25.Em, 82.60.Lf